<template>
  <a-card :bordered="false" style="margin-left: 20px;height: 100%;">
      <div class="detail-top">
        <div class="top-back" @click="handleback">
          <img class="icon-back" src="../../assets/images/web-statistics/return.png" alt="">
          <span style="margin-left: 10px;">return</span>
        </div>
        <div class="top-actions">
          <div class="right-btn" @click="downloadZip">
            <!-- <a :href="zipSrc" :download="type" target="_blank" rel="noopener noreferrer"> -->
              <img class="icon-download" src="../../assets/images/web-statistics/download.png" alt="">
              <span style="margin-left: 10px;">
                ZIP
              </span>
            <!-- </a> -->
          </div>
          <div class="right-btn" @click="downloadFile">
            <!-- <a :href="fileSrc" :download="type"> -->
              <img class="icon-download" src="../../assets/images/web-statistics/download.png" alt="">
              <span style="margin-left: 10px;">
                TXT
              </span>
            <!-- </a> -->
          </div>
          <div class="right-btn" @click="viewFile">
            <!-- <a :href="fileSrc" target="_blank"> -->
              <img class="icon-view" src="../../assets/images/web-statistics/view.png" alt="">
              <span style="margin-left: 10px;">
                View Report
              </span>
            <!-- </a> -->
          </div>
        </div>
      </div>
      <a-tabs default-active-key="info" @change="handleTabChange">
        <a-tab-pane key="info" tab="INFO" v-if="allData.headerBlock===null?false:true">
          <template>
            <div class="pane-title">GENERAL INFORMATION</div>
            <a-row>
              <a-col :span="12" class="info-key">Site Code:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.siteCode }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Detector Code:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.detectorCode }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">System Type:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.systemType }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Sample Geometry:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.sampleGeometry }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Spectrum Qualifier:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.spectrumQualifier }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Sample Reference Identification:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.sampleReferenceIdentification }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Measurement Identification:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.measurementIdentification }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Detector Background Measurement Identification:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.detectorBackgroundMeasurementId }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Gas Background Measurement Identification:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.gasBackgroundMeasurementId }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Transmit Time:</a-col>
              <a-col :span="12" class="info-val">{{ allData.headerBlock.transmitDate }}</a-col>
            </a-row>
          </template>
          <template v-if="allData.commentBlock && allData.commentBlock.text">
            <div class="pane-title">COMMENT</div>
            <a-row style="height: auto;">
              <a-col class="comment-block" :span="24" v-html="commentText"></a-col>
            </a-row>
          </template>
          <template v-if="allData.acquisitionBlock">
            <div class="pane-title">ACQUISITION</div>
            <a-row>
              <a-col :span="12" class="info-key">Acquisition Time:</a-col>
              <a-col :span="12" class="info-val">{{ allData.acquisitionBlock.acquisitionStartDate }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Acquisition Real Time:</a-col>
              <a-col :span="12" class="info-val">{{ allData.acquisitionBlock.acquisitionRealTime }}</a-col>
            </a-row>
            <a-row>
              <a-col :span="12" class="info-key">Acquisition Live Time:</a-col>
              <a-col :span="12" class="info-val">{{ allData.acquisitionBlock.acquisitionLiveTime }}</a-col>
            </a-row>
          </template>
          <template v-if="allData.calibrationBlock">
            <div class="pane-title">CALIBRATION</div>
            <a-row>
              <a-col :span="12" class="info-key">Date of Last Calibration</a-col>
              <a-col :span="12" class="info-val">{{ allData.calibrationBlock.dateOfLastCalibration }}</a-col>
            </a-row>
          </template>
        </a-tab-pane>
        <a-tab-pane key="energy" tab="ENERGY" v-if="allData.genergyBlock===null?false:true" forceRender>
          <div class="pane-title" style="margin-bottom: 15px;">G ENERGY</div>
          <custom-table
            size="middle"
            :rowKey="getUid()"
            :columns="columnsEnergy_G"
            :list="dataSourceEnergy_G"
            :pagination="false"
            :canSelect="false"
          >
          </custom-table>
          <template v-if="allData.benergyBlock===null?false:true">
            <div class="pane-title" style="margin: 15px 0;">B ENERGY</div>
            <custom-table
              size="middle"
              :rowKey="getUid()"
              :columns="columnsEnergy_B"
              :list="dataSourceEnergy_B"
              :pagination="false"
              :canSelect="false"
            >
            </custom-table>
          </template>
        </a-tab-pane>
        <a-tab-pane key="resulution" tab="RESOLUTION" v-if="allData.gresolutionBlock===null?false:true" forceRender>
          <div class="pane-title" style="margin-bottom: 15px;">G RESOLUTION</div>
          <custom-table
            size="middle"
            :rowKey="getUid()"
            :columns="columnsResulution_G"
            :list="dataSourceResulution_G"
            :pagination="false"
            :canSelect="false"
          >
          </custom-table>
          <template v-if="allData.bresolutionBlock===null?false:true">
            <div class="pane-title" style="margin: 15px 0;">B RESOLUTION</div>
            <custom-table
              size="middle"
              :rowKey="getUid()"
              :columns="columnsResulution_B"
              :list="dataSourceResulution_B"
              :pagination="false"
              :canSelect="false"
            >
            </custom-table>
          </template>
        </a-tab-pane>
        <a-tab-pane key="efficiency" tab="EFFICIENCY" v-if="allData.gefficiencyBlock===null?false:true" forceRender>
          <div class="pane-title" style="margin-bottom: 15px;">GAMMA EFFICIENCY</div>
          <custom-table
            size="middle"
            :rowKey="getUid()"
            :columns="columnsEfficiency_G"
            :list="dataSourceEfficiency_G"
            :pagination="false"
            :canSelect="false"
          >
          </custom-table>
          <template  v-if="allData.bgEfficiencyBlock===null?false:true">
            <div class="pane-title" style="margin: 15px 0;">BETA-GAMMA EFFICIENCY</div>
            <custom-table
              size="middle"
              :rowKey="getUid()"
              :columns="columnsEfficiency_BG"
              :list="dataSourceEfficiency_BG"
              :pagination="false"
              :canSelect="false"
            >
            </custom-table>
          </template>
        </a-tab-pane>
        <a-tab-pane key="roi" tab="ROI" v-if="allData.roiLimitsBlock===null?false:true" forceRender>
          <div class="pane-title" style="margin-bottom: 15px;">ROI LIMITS</div>
          <custom-table
            size="middle"
            :rowKey="getUid()"
            :columns="columnsRoiLimits"
            :list="dataSourceRoiLimits"
            :pagination="false"
            :canSelect="false"
          >
          </custom-table>
        </a-tab-pane>
        <a-tab-pane key="ratios" tab="RATIOS" v-if="allData.ratiosBlock===null?false:true" forceRender>
          <div class="pane-title" style="margin-bottom: 15px;">RATIOS</div>
          <custom-table
            size="middle"
            :rowKey="getUid()"
            :columns="columnsRatios"
            :list="dataSourceRatios"
            :pagination="false"
            :canSelect="false"
          >
          </custom-table>
        </a-tab-pane>
        <a-tab-pane key="gamma-spectrum" tab="GAMMA SPECTRUM" v-if="allData.gspectrumBlock===null?false:true">
          <div class="pane-title" style="margin-bottom: 15px;">GAMMA SPECTRUM</div>
          <div class="gamma-spectrum-row">
              <div>
                <span class="span-key">Number of Channels：</span><span class="row-val">{{ allData.gspectrumBlock.numberGChannels }}</span>
                <span class="span-key" style="margin-left: 35px;">Energy Span：</span><span class="row-val">{{ allData.gspectrumBlock.energySpan }}</span> 
              </div>
              <div>
                <a-checkbox style="margin-right: 15px;" @change="e=>yLogChange(e,'G')">Y log scale</a-checkbox>
                <a-button class="row-btn" @click="resetZoom('G')">Reset Zoom</a-button>
              </div>
          </div>
          <div class="gamma-spectrum-chart" id="spectrumChartRef_G"></div>
        </a-tab-pane>
        <a-tab-pane key="beta-spectrum" tab="BETA SPECTRUM" v-if="allData.bspectrumBlock===null?false:true">
          <div class="pane-title" style="margin-bottom: 15px;">BETA SPECTRUM</div>
          <div class="gamma-spectrum-row">
              <div>
                <span class="span-key">Number of Channels：</span><span class="row-val">{{ allData.bspectrumBlock.numberBChannels }}</span>
                <span class="span-key" style="margin-left: 35px;">Energy Span：</span><span class="row-val">{{ allData.bspectrumBlock.energySpan }}</span> 
              </div>
              <div>
                <a-checkbox style="margin-right: 15px;" @change="e=>yLogChange(e,'B')">Y log scale</a-checkbox>
                <a-button class="row-btn" @click="resetZoom('B')">Reset Zoom</a-button>
              </div>
          </div>
          <div class="gamma-spectrum-chart" id="spectrumChartRef_B"></div>
        </a-tab-pane>
        <a-tab-pane key="histogram" tab="HISTOGRAM" v-if="allData.bspectrumBlock===null?false:true">
          <div class="pane-title" style="margin-bottom: 15px;">HISTOGRAM</div>
          <div class="gamma-spectrum-row">
              <div>
                <span class="span-key">Number of B Channels：</span><span class="row-val">{{ allData.histogramBlock.bchannels }}</span>
                <span class="span-key" style="margin-left: 35px;">B Energy Span：</span><span class="row-val">{{ allData.histogramBlock.benergySpan }}</span> 
                <span class="span-key" style="margin-left: 35px;">Number of G Channels：</span><span class="row-val">{{ allData.histogramBlock.gchannels }}</span> 
                <span class="span-key" style="margin-left: 35px;">G Energy Span：</span><span class="row-val">{{ allData.histogramBlock.genergySpan }}</span> 
              </div>
          </div>
          <div class="gamma-spectrum-chart" id="histogramChartRef"></div>
        </a-tab-pane>
        <a-tab-pane key="certificate" tab="CERTIFICATE" v-if="allData.certificateBlock===null?false:true" forceRender>
          <div class="pane-title" style="margin-bottom: 15px;">CERTIFICATE</div>
          <div class="certificate-row">
            <span class="span-key">Total Source Activity [ Bq ]：</span><span class="row-val">{{ allData.certificateBlock.totalSourceActivity }}</span>
            <span class="span-key" style="margin-left: 35px;">Assay Date：</span><span class="row-val">{{ allData.certificateBlock.assayDate }}</span> 
            <span class="span-key" style="margin-left: 35px;">Units of Activity：</span><span class="row-val">{{ allData.certificateBlock.unitsOfActivity }}</span> 
          </div>
          <custom-table
            size="middle"
            :rowKey="getUid()"
            :columns="columnsCertificate"
            :list="dataSourceCertificate"
            :pagination="false"
            :canSelect="false"
          >
          </custom-table>
        </a-tab-pane>
      </a-tabs>
    </a-card>
</template>

<script>
import { saveAs } from 'file-saver'
import JSZip from 'jszip'
import { getAction } from '../../api/manage'
const colorList=["#0D5fff","#287D3C","#DF1512","#F3BF24","#D3D4DE","#000000"]
import * as echarts from 'echarts'
export default {
    props: {
      allData: {
        type: Object,
        default: ()=>{}
      },
      sampleId: {
      },
      type: {
        type: String,
        default:""
      }
    },
    watch: {
      allData: {
        handler(val) {
          console.log(val);
        },
        deep: true,
        immediate:true
      }
    },
    data() {
      return {
        yAxisType_g:"value",
        yAxisType_b:"value",
        spectrumChart_G:null,
        spectrumChart_B:null,
        histogramChart:null,
        loading:true,
        myChart:null,
        commentText: "",
        columnsEnergy_G: [
          {
            title: 'G-Energy [keV]',
            align: 'left',
            dataIndex: 'energy'
          },
          {
            title: 'Centroid channel',
            align: 'left',
            dataIndex: 'centroid'
          },
          {
            title: 'Uncertainty (channels)',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        columnsEnergy_B: [
          {
            title: 'Electron energy [keV]',
            align: 'left',
            dataIndex: 'electronEnergy'
          },
          {
            title: 'Decay mode descriptor',
            align: 'left',
            dataIndex: 'decayModeDescriptor'
          },
          {
            title: 'Maximum channel / centroid channel of CE',
            align: 'left',
            dataIndex: 'maximumChannel'
          },
          {
            title: 'Uncertainty',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        dataSourceEnergy_G:[],
        dataSourceEnergy_B:[],
        columnsResulution_G: [
          {
            title: 'G-Energy [keV]',
            align: 'left',
            dataIndex: 'energy'
          },
          {
            title: 'FWHM [keV]',
            align: 'left',
            dataIndex: 'fwhm'
          },
          {
            title: 'Uncertainty [keV]',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        columnsResulution_B: [
          {
            title: 'Electron energy [keV]',
            align: 'left',
            dataIndex: 'electronEnergy'
          },
          {
            title: 'FWHM [keV]',
            align: 'left',
            dataIndex: 'fwhm'
          },
          {
            title: 'Uncertainty [keV]',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        dataSourceResulution_G:[],
        dataSourceResulution_B:[],
        columnsEfficiency_G: [
          {
            title: 'Energy',
            align: 'left',
            dataIndex: 'energy'
          },
          {
            title: 'Efficiency',
            align: 'left',
            dataIndex: 'efficiency'
          },
          {
            title: 'Uncertainty',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        columnsEfficiency_BG: [
          {
            title: 'Nuclide name',
            align: 'left',
            dataIndex: 'nuclideName'
          },
          {
            title: 'ROI number',
            align: 'left',
            dataIndex: 'roiNumber'
          },
          {
            title: 'Coincidence efficiency',
            align: 'left',
            dataIndex: 'coincidenceEfficiency'
          },
          {
            title: 'ROI range start',
            align: 'left',
            dataIndex: 'roiGRangeStart'
          },
          {
            title: 'Uncertainty',
            align: 'left',
            dataIndex: 'uncertainty'
          },
        ],
        dataSourceEfficiency_G: [],
        dataSourceEfficiency_BG: [],
        columnsRoiLimits: [
          {
            title: 'ROI number',
            align: 'left',
            dataIndex: 'roiNumber'
          },
          {
            title: '2-D B-range start',
            align: 'left',
            dataIndex: 'roiBRangeStart'
          },
          {
            title: '2-D B-range stop',
            align: 'left',
            dataIndex: 'roiBRangeStop'
          },
          {
            title: '2-D G-range start',
            align: 'left',
            dataIndex: 'roiGRangeStart'
          },
          {
            title: '2-D G-range stop',
            align: 'left',
            dataIndex: 'roiGRangeStop'
          }
        ],
        dataSourceRoiLimits: [],
        columnsRatios: [
          {
            title: 'Ratio identifier',
            align: 'left',
            dataIndex: 'ratioId'
          },
          {
            title: 'ROI number for higher G-energy',
            align: 'left',
            dataIndex: 'roiNumberHigherEnergy'
          },
          {
            title: 'ROI number for lower G-energy',
            align: 'left',
            dataIndex: 'roiNumberLowerEnergy'
          },
          {
            title: 'Count ratio',
            align: 'left',
            dataIndex: 'countRatio'
          },
          {
            title: 'Count ratio uncertainty',
            align: 'left',
            dataIndex: 'countRatioUncertainty'
          },
        ],
        dataSourceRatios:[],
        columnsCertificate: [
          {
            title: 'Nuclide name',
            align: 'left',
            dataIndex: 'nuclideName'
          },
          {
            title: 'Half-life',
            align: 'left',
            dataIndex: 'halfLife'
          },
          {
            title: 'Activity',
            align: 'left',
            dataIndex: 'nuclideActivity'
          },
          {
            title: 'Uncertainty',
            align: 'left',
            dataIndex: 'uncertainty'
          },
          {
            title: 'Energy',
            align: 'left',
            dataIndex: 'Genergy'
          },
          {
            title: 'Intensity',
            align: 'left',
            dataIndex: 'intensity'
          },
          {
            title: 'Electron decay',
            align: 'left',
            dataIndex: 'electronDecayModeDescriptor'
          },
          {
            title: 'Maximum',
            align: 'left',
            dataIndex: 'maxBParticleEnergy'
          },
          {
            title: 'Particle B intensity',
            align: 'left',
            dataIndex: 'particleBIntensity'
          }
        ],
        dataSourceCertificate: [],
        dataSourceSpectrum_G: [],
        dataSourceSpectrumX_G: [],
        dataSourceSpectrum_B: [],
        dataSourceSpectrumX_B: [],
        // HISTOGRAM
        dataSourceHistogray: {
          level_1:[],
          level_2:[],
          level_3:[],
          level_4:[],
          level_5:[],
          level_6:[]
        },
        fileSrc: "",
        zipSrc:""
      }
    },
  mounted() {
    this.getFildBlob()
      this.commentText = this.allData.commentBlock && this.allData.commentBlock.text?this.allData.commentBlock.text.replace(/\n/g, "<br />"):""
      this.dataSourceEnergy_G=this.allData.genergyBlock
      this.dataSourceEnergy_B=this.allData.benergyBlock
      this.dataSourceResulution_G=this.allData.gresolutionBlock
      this.dataSourceResulution_B=this.allData.bresolutionBlock
      this.dataSourceEfficiency_G = this.allData.gefficiencyBlock
      this.dataSourceEfficiency_BG = this.allData.bgEfficiencyBlock
      this.dataSourceRoiLimits = this.allData.roiLimitsBlock
      this.dataSourceRatios = this.allData.ratiosBlock
      this.dataSourceSpectrum_G = this.allData.gspectrumBlock&&this.allData.gspectrumBlock.gspectrumSubBlock
      this.dataSourceSpectrumX_G = this.allData.gspectrumBlock&&this.allData.gspectrumBlock.gspectrumSubBlock.map((item, index) => {
        return index
      })
      this.dataSourceSpectrum_B = this.allData.bspectrumBlock&&this.allData.bspectrumBlock.bspectrumSubBlock
      this.dataSourceSpectrumX_B = this.allData.bspectrumBlock&&this.allData.bspectrumBlock.bspectrumSubBlock.map((item, index) => {
        return index
      })
      this.allData.histogramBlock&&this.allData.histogramBlock.histogramSubBlock.forEach(item => {
        if (item.c === 1) {
          this.dataSourceHistogray.level_1.push(item)
        } else if (item.c <= 5 && item.c > 1) {
          this.dataSourceHistogray.level_2.push(item)
        } else if (item.c <= 10 && item.c > 5) {
          this.dataSourceHistogray.level_3.push(item)
        } else if (item.c <= 50 && item.c > 10) {
          this.dataSourceHistogray.level_4.push(item)
        } else if (item.c <= 100 && item.c > 50) {
          this.dataSourceHistogray.level_5.push(item)
        } else if (item.c > 100) {
          this.dataSourceHistogray.level_6.push(item)
        }
      });
      this.dataSourceCertificate = this.allData.certificateBlock ? this.allData.certificateBlock.certificateSubBlock : []
      // this.getFildBlob()
    },
  methods: {
    getFildBlob() {
      let _this = this
      let params = {
        sampleId: this.sampleId,
        // sampleId:"1523651"
      }
      let url = "/webStatistics/radionuclideFile"
      getAction(url, params).then((res) => {
        if (res.code&&res.code==500) {
          _this.fileSrc = ""
        } else {
          const blob = new Blob([res], { type: 'text/plain' })
          _this.fileSrc = window.URL.createObjectURL(blob)
        }
      })
    },
    downloadFile() {
      if (this.fileSrc) {
        let link = document.createElement('a')
        link.href = this.fileSrc
        link.target = '_blank'
        link.download = this.type
        document.body.appendChild(link)
        link.click()
        document.body.removeChild(link)
      } else {
        this.$message.warning("This operation fails. Contact your system administrator")
      }
    },
    downloadZip() {
      getAction('/webStatistics/radionuclideFile',{
        sampleId: this.sampleId,
      }).then(async res => {
        if (res.code&&res.code==500) {
          this.$message.warning("This operation fails. Contact your system administrator")
        } else {
          const arrayBufferView = new Uint8Array(res)
          const zip = new JSZip()
          const blob = new Blob([res], { type: 'text/plain' })
          // saveAs(blob, 'files.txt');
          // 将文件添加到ZIP中
          zip.file(`${this.type}.txt`, blob, { binary: true });
          // 生成ZIP文件
          const zipContent = await zip.generateAsync({ type: 'blob' });
          // 保存ZIP文件
          saveAs(zipContent, this.type);
        }
      })
    },
    viewFile() {
      if (this.fileSrc) {
        let link = document.createElement('a')
        link.href = this.fileSrc
        link.target = '_blank'
        document.body.appendChild(link)
        link.click()
        document.body.removeChild(link)
      } else {
        this.$message.info("File preview failed")
      }
    },
    getUid() {
      return (Math.random()+new Date().getTime()).toString(32).slice(0,8)
    },
    changeData(data) {
      let arr = data.map(item => {
        if (item==0) {
          return 1
        } else {
          return item
        }
      })
      return arr
    },
    yLogChange(e,str) {
      let yAxisType = e.target.checked ? "log" : "value"
      str === "G" ? this.yAxisType_g = yAxisType : this.yAxisType_b = yAxisType
      let dataArr =[]
      if (e.target.checked) {
        
        dataArr = this.changeData(str === "G"?this.dataSourceSpectrum_G:this.dataSourceSpectrum_B)
      } else {
        dataArr = str === "G"?this.dataSourceSpectrum_G:this.dataSourceSpectrum_B
      }
      let options = {
        yAxis: {
          type: str==="G"?this.yAxisType_g:this.yAxisType_b,
          splitLine: {
            show: true,
            lineStyle: {
              color: "rgbA(64, 105, 121, 0.2)"
            }
          },
          axisLabel: {
            formatter: function (value) {
              if (e.target.checked) {
                return value == 1 ? 0 : value
              } else {
                return value
              }
            }
          },
          scale: false
        },
        series: [
          {
            type: 'line',
            itemStyle: { normal: { color: '#0656ff' } },
            data: dataArr
          }
        ]
      }
      if (str === "G") {
        this.spectrumChart_G.setOption(options)
      } else {
        this.spectrumChart_B.setOption(options)
      }
    },
    resetZoom(str) {
      let options = {
        dataZoom: [
          {
            start: 0,
            end: 100
          }
        ],
      }
      if (str === "G") {
        this.spectrumChart_G.setOption(options)
      } else {
        this.spectrumChart_B.setOption(options)
      }
    },
    handleback() {
      this.$emit("back",false)
    },
    handleTabChange(key) {
      if (key === "gamma-spectrum") {
        this.$nextTick(() => {
          this.drawSpectrumChart_G()
        })
      } else if (key === "beta-spectrum") {
        this.$nextTick(() => {
          this.drawSpectrumChart_B()
        })
      } else if (key === "histogram"){
        this.$nextTick(() => {
          this.drawHistogramChart()
        })
      }
    },
    getOptions(str) {
      return {
        tooltip: {
          trigger: 'axis',
          formatter: function (params) {
            return `<div>${params[0].axisValueLabel}</div>
              <div style="color:#0656ff">value：${params[0].value}</div>
            `
          }
        },
        xAxis: {
          // type:"value",
          scale: false,
          splitLine: {
            show: true,
            lineStyle: {
              color: "rgbA(64, 105, 121, 0.2)"
            },
          },
          boundaryGap:false,
          interval: 25,
          max:str==="G"?this.allData.gspectrumBlock.numberGChannels:this.allData.bspectrumBlock.numberBChannels,
          data: str === "G" ? this.dataSourceSpectrumX_G : this.dataSourceSpectrumX_B
        },
        grid: {
          left: '3%',
          right: '4%',
          bottom: '10%',
          containLabel: true
        },
        yAxis: {
          type: str==="G"?this.yAxisType_g:this.yAxisType_b,
          splitLine: {
            show: true,
            lineStyle: {
              color: "rgbA(64, 105, 121, 0.2)"
            }
          },
          scale: false
        },
        dataZoom: [
          {
            start: 0,
            end: 100
          }
        ],
        series: [
          {
            type: 'line',
            itemStyle: { normal: { color: '#0656ff' } },
            data: str==="G"?this.dataSourceSpectrum_G:this.dataSourceSpectrum_B
          }
        ]
      }
    },
    drawSpectrumChart_G() {
      this.spectrumChart_G = echarts.init(document.getElementById("spectrumChartRef_G"))
      this.spectrumChart_G.setOption(this.getOptions("G"))
      window.addEventListener("resize", function () {
        this,spectrumChart_G.resize();
      });
    },
    drawSpectrumChart_B() {
      this.spectrumChart_B = echarts.init(document.getElementById("spectrumChartRef_B"))
      this.spectrumChart_B.setOption(this.getOptions("B"))
      window.addEventListener("resize", function () {
        this.spectrumChart_B.resize();
      });
    },
    drawHistogramChart() {
      let dataset=[],series=[]
      for (const key in this.dataSourceHistogray) {
        if (Object.hasOwnProperty.call(this.dataSourceHistogray, key)) {
          if (this.dataSourceHistogray[key].length>0) {
            dataset.push({
              source: this.dataSourceHistogray[key]
            })
          }
        }
      }
      series = dataset.map((item,index) => {
        return {
          type: 'scatter',
          dimensions: ["b", "g"],
          datasetIndex: index,
          itemStyle: {
            color:colorList[index]
          }
        }
      })
      this.histogramChart = echarts.init(document.getElementById("histogramChartRef"))
      this.histogramChart.setOption({
        dataset,
        xAxis: {
          scale: false,
          splitLine: {
            show: true,
            lineStyle: {
              color: "rgbA(64, 105, 121, 0.2)"
            },
          },
          interval:65,
          max:260
        },
        yAxis: {
          scale: false,
          splitLine: {
            show: true,
            lineStyle: {
              color: "rgbA(64, 105, 121, 0.2)"
            },
          },
          interval:65,
          max:260
        },
        tooltip: {
          trigger: "item",
          formatter: function (params) {
            return `<div>Beta：${params.value.b}</div>
              <div>Gamma：${params.value.g}</div>
              <div>Count：${params.value.c}</div>`
          }
        },
        grid: {
          left: '3%',
          right: '4%',
          bottom: '10%',
          containLabel: true
        },
        series
      })
      window.addEventListener("resize", function () {
        this.histogramChart.resize();
      });
    }
  }
}
</script>

<style lang="less" scoped>
.detail-top{
  width: 100%;
  height: 50px;
  padding: 0 10px;
  background-color: rgba(12, 235, 201, 0.05);
  border-top: 1px solid rgba(12, 235, 201, 0.3);
  border-bottom: 1px solid rgba(12, 235, 201, 0.3);
  display: flex;
  align-items: center;
  justify-content: space-between;
  margin-bottom: 16px;
  .top-back{
    font-family: MicrosoftYaHei;
    font-size: 16px;
    font-weight: normal;
    font-stretch: normal;
    letter-spacing: 0px;
    color: #69a19f;
    cursor: pointer;
    .icon-back{
      width: 28px;
      height: 24px;
    }
  }
  .top-actions{
    .right-btn{
      display: inline-block;
      height: 32px;
      line-height: 32px;
      padding: 0 12px;
      margin-left: 20px;
	    background-color: #1397a3;
      cursor: pointer;
      .icon-download{
        width: 16px;
        height: 19px;
      }
      .icon-view{
        width: 15px;
        height: 16px;
      }
      a{
        color: white;
      }
    }
  }
}
::v-deep {
  .ant-tabs{
    height: calc(100% - 66px);
    .ant-tabs-top-content{
      height: calc(100% - 56px);
      .ant-tabs-tabpane{
        height: 100%;
        overflow: auto;
        background-color: #02282b;
      }
    }
  }
  .ant-tabs-bar{
    width: 100%;
    height: 40px;
    background-color: rgba(12, 235, 201, 0.05);
    border-top: 1px solid rgba(12, 235, 201, 0.3);
    border-bottom: 1px solid rgba(12, 235, 201, 0.3);
  }
  .ant-tabs-nav .ant-tabs-tab{
    height: 30px;
    line-height: 30px;
    background-color: rgba(58, 236, 240, 0.22);
    font-family: BookmanOldStyle;
    font-size: 16px;
    font-weight: bold;
    font-stretch: normal;
    letter-spacing: 2px;
    color: #c9f6f6;
    margin: 0 0 0 10px;
    padding: 0 23px;
    position: relative;
    &::before{
      content: "";
      position: absolute;
      top: 0;
      left: 0;
      width: 7px;
      height: 29px;
      color: rgba(58, 236, 240, 0.22);
      border: 1px solid #569e9e;
      border-right: none;
      border-radius: 0;
    }
    &::after{
      content: "";
      position: absolute;
      top: 0;
      right: 0;
      width: 7px;
      height: 29px;
      color: rgba(58, 236, 240, 0.22);
      border: 1px solid #569e9e;
      border-left: none;
    }
    &-active{
      &::before,
          &::after {
            border-color: #0cecca !important;
          }
    }
  }
  .ant-tabs-ink-bar{
    display: none !important
  }
  .ant-tabs-nav .ant-tabs-tab-active{
    color: #2affdf;
  }
  .ant-tabs-tabpane{
    width: 100%;
    height: calc(100% - 122px);
    border: solid 1px #416f7f;
    padding: 15px 20px;
  }
  .ant-tabs .ant-tabs-top-content > .ant-tabs-tabpane-inactive{
    padding: 15px 20px !important
  }
  .ant-row{
    height: 36px;
    line-height: 36px;
  }
  .ant-tabs-tab-prev, .ant-tabs-tab-next{
    color: #c9f6f6;
  }
  .ant-tabs-tab-prev:hover, .ant-tabs-tab-next:hover{
    color: #2affdf;
  }
}
.pane-title{
  height: 40px;
  background-color: rgba(12, 235, 201, 0.05);
  line-height: 40px;
  font-family: ArialMT;
  font-size: 18px;
  font-weight: bold;
  font-stretch: normal;
  letter-spacing: 1px;
  color: #0cebc9;
  padding: 0 0 0 18px;
}
.info-key{
  font-family: ArialMT;
	font-size: 16px;
	font-weight: bold;
	color: #ffffff;
}
.info-val{
  font-family: ArialMT;
	font-size: 16px;
	color: #ade6ee;
}
.span-key{
  font-family: MicrosoftYaHei;
	font-size: 16px;
	color: #ffffff;
}
.comment-block{
  background-color: #0d6d76;
  margin: 10px 0;
  padding: 20px;
  line-height: 24px;
  border-radius: 4px;
}
.gamma-spectrum-row{
  display: flex;
  align-items: center;
  justify-content: space-between;
  .row-val{
    font-family: MicrosoftYaHei;
    font-size: 16px;
    color: #ade6ee;
  }
  .row-btn{
    height: 26px;
	  background-color: #406979;
    line-height: 26px;
    border: none;
  }
}
.gamma-spectrum-chart{
  width: 100%;
  height: calc(100% - 81px);
}
.certificate-row{
  height: 30px;
  display: flex;
  align-items: center;
  font-family: MicrosoftYaHei;
	color: #ade6ee;
  margin-bottom: 10px;
}
</style>